/*
 Navicat Premium Data Transfer

 Source Server         : localhost
 Source Server Type    : MySQL
 Source Server Version : 100302
 Source Host           : localhost:3306
 Source Schema         : fullautowaterpressure

 Target Server Type    : MySQL
 Target Server Version : 100302
 File Encoding         : 65001

 Date: 24/01/2026 13:57:36
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for scandata
-- ----------------------------
DROP TABLE IF EXISTS `scandata`;
CREATE TABLE `scandata`  (
  `Id` int NOT NULL AUTO_INCREMENT,
  `barcode` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `diffpressure` decimal(10, 2) NULL DEFAULT NULL,
  `temperature` decimal(10, 2) NULL DEFAULT NULL,
  `dwelltime` decimal(10, 2) NULL DEFAULT NULL,
  `CreateTime` datetime NOT NULL,
  `IsHighMode` bit(1) NOT NULL DEFAULT b'0',
  PRIMARY KEY (`Id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 21 CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of scandata
-- ----------------------------
INSERT INTO `scandata` VALUES (1, '1212121212', 1.00, 122.00, 1.00, '2026-01-24 11:40:52', b'0');
INSERT INTO `scandata` VALUES (2, '1212121212', 1.00, 122.00, 1.00, '2026-01-24 11:40:52', b'0');

SET FOREIGN_KEY_CHECKS = 1;
