/*
 Navicat Premium Data Transfer

 Source Server         : localhost
 Source Server Type    : MySQL
 Source Server Version : 100302
 Source Host           : localhost:3306
 Source Schema         : fullautowaterpressure

 Target Server Type    : MySQL
 Target Server Version : 100302
 File Encoding         : 65001

 Date: 07/01/2026 13:44:43
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for normaltemperature
-- ----------------------------
DROP TABLE IF EXISTS `normaltemperature`;
CREATE TABLE `normaltemperature`  (
  `Id` int NOT NULL AUTO_INCREMENT,
  `barcode` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `temperature` decimal(10, 2) NULL DEFAULT NULL,
  `startpressure` decimal(10, 2) NULL DEFAULT NULL,
  `dwelltime` decimal(10, 2) NULL DEFAULT NULL,
  `diffpressure` decimal(10, 2) NULL DEFAULT NULL,
  `endpressure` decimal(10, 2) NULL DEFAULT NULL,
  `CreateTime` datetime NOT NULL,
  `type` int NOT NULL,
  PRIMARY KEY (`Id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 12 CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of normaltemperature
-- ----------------------------
INSERT INTO `normaltemperature` VALUES (1, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-04 20:41:52', 0);
INSERT INTO `normaltemperature` VALUES (2, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 09:38:00', 0);
INSERT INTO `normaltemperature` VALUES (3, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 09:42:21', 0);
INSERT INTO `normaltemperature` VALUES (4, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 10:00:03', 0);
INSERT INTO `normaltemperature` VALUES (5, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 10:05:09', 0);
INSERT INTO `normaltemperature` VALUES (6, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 10:06:13', 0);
INSERT INTO `normaltemperature` VALUES (7, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 10:06:45', 0);
INSERT INTO `normaltemperature` VALUES (8, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 10:12:52', 0);
INSERT INTO `normaltemperature` VALUES (9, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 10:37:02', 0);
INSERT INTO `normaltemperature` VALUES (10, '', 0.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 11:17:36', 0);
INSERT INTO `normaltemperature` VALUES (11, '', 4020.00, 0.00, 0.00, 0.00, 0.00, '2026-01-07 11:49:17', 0);

SET FOREIGN_KEY_CHECKS = 1;
