/*
 Navicat Premium Data Transfer

 Source Server         : localhost_3306
 Source Server Type    : MySQL
 Source Server Version : 100302
 Source Host           : localhost:3306
 Source Schema         : fullautowaterpressure

 Target Server Type    : MySQL
 Target Server Version : 100302
 File Encoding         : 65001

 Date: 04/02/2026 21:05:13
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for normaltemperature
-- ----------------------------
DROP TABLE IF EXISTS `normaltemperature`;
CREATE TABLE `normaltemperature`  (
  `Id` int NOT NULL AUTO_INCREMENT,
  `barcode` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '条码',
  `temperature` decimal(10, 2) NULL DEFAULT NULL COMMENT '温度',
  `startpressure` decimal(10, 2) NULL DEFAULT NULL COMMENT '初始压力',
  `dwelltime` decimal(10, 2) NULL DEFAULT NULL COMMENT '保压时间',
  `diffpressure` decimal(10, 2) NULL DEFAULT NULL,
  `endpressure` decimal(10, 2) NULL DEFAULT NULL,
  `CreateTime` datetime NOT NULL,
  `type` int NOT NULL COMMENT '高低温模式0常温1高温',
  `kzh` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '刻字号',
  `starttime` datetime NULL DEFAULT NULL COMMENT '开始时间',
  `endtime` datetime NULL DEFAULT NULL COMMENT '结束时间',
  `lldh` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '联络单号',
  `jh` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '件号',
  `quantity` int NULL DEFAULT NULL COMMENT '数量',
  `standarderror` decimal(10, 2) NULL DEFAULT NULL COMMENT '标准差值',
  `testresult` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '测试结果',
  PRIMARY KEY (`Id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 115 CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of normaltemperature
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
