-- 回滚scandata表新增字段：刻字号、数量、压差设置、标准误差
-- 执行日期：2026-02-04

USE fullautowaterpressure;

-- 删除刻字号字段
ALTER TABLE scandata 
DROP COLUMN IF EXISTS EngravingNumber;

-- 删除数量字段
ALTER TABLE scandata 
DROP COLUMN IF EXISTS Quantity;

-- 删除压差设置字段
ALTER TABLE scandata 
DROP COLUMN IF EXISTS PressureDifference;

-- 删除标准误差字段
ALTER TABLE scandata 
DROP COLUMN IF EXISTS StandardError;

-- 验证字段是否删除成功
SELECT 
    COLUMN_NAME, 
    DATA_TYPE, 
    COLUMN_COMMENT 
FROM 
    INFORMATION_SCHEMA.COLUMNS 
WHERE 
    TABLE_SCHEMA = 'fullautowaterpressure' 
    AND TABLE_NAME = 'scandata';
