/*
 Navicat Premium Data Transfer

 Source Server         : localhost_3306
 Source Server Type    : MySQL
 Source Server Version : 100302
 Source Host           : localhost:3306
 Source Schema         : fullautowaterpressure

 Target Server Type    : MySQL
 Target Server Version : 100302
 File Encoding         : 65001

 Date: 05/02/2026 10:22:35
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for scandata
-- ----------------------------
DROP TABLE IF EXISTS `scandata`;
CREATE TABLE `scandata`  (
  `Id` int NOT NULL AUTO_INCREMENT,
  `barcode` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `exit_temperature` float NULL DEFAULT NULL,
  `diffpressure` float(10, 2) NULL DEFAULT NULL,
  `temperature` float(10, 2) NULL DEFAULT NULL,
  `dwelltime` float(10, 2) NULL DEFAULT NULL,
  `CreateTime` datetime NOT NULL,
  `TemperatureMode` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL DEFAULT '\0',
  `kzh` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '刻字号',
  `lldh` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '联络单号',
  `jh` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '件号',
  `quantity` int NULL DEFAULT NULL COMMENT '数量',
  `pressuresetting` float(10, 2) NULL DEFAULT NULL,
  `standarderror` decimal(10, 2) NULL DEFAULT NULL,
  PRIMARY KEY (`Id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 39 CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of scandata
-- ----------------------------

SET FOREIGN_KEY_CHECKS = 1;
